From 0e8e32a13a75b23eb9fde1c53dd8004df52043a7 Mon Sep 17 00:00:00 2001
From: 135e2 <135e2@135e2.tk>
Date: Tue, 9 Aug 2022 19:13:37 +0800
Subject: chore: use more user-friendly toggle key...

... since Shift+Tab is already used by Windows. Microsoft sucks tho.
---
 src/App.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/App.vue')

diff --git a/src/App.vue b/src/App.vue
index 1beefd2..24f5b83 100644
--- a/src/App.vue
+++ b/src/App.vue
@@ -1,5 +1,5 @@
 <template>
-  <v-app @keyup.shift.tab="toggleDrawer" :style="bg">
+  <v-app @click.ctrl="toggleDrawer" :style="bg">
     <v-navigation-drawer temporary v-model="drawer" location="right"
       ><v-list density="compact" nav>
         <v-list-item
-- 
cgit v1.2.3

